---
id: 'postgres-connection-logging'
title: 'Postgres connection logging'
description: 'Enable or disable Postgres connection logging for audit and compliance.'
---

For security monitoring and compliance audits, Postgres can log connection lifecycle events to your project's [Postgres logs](/docs/guides/telemetry/logs#postgres), including events such as `connection received`, `connection authenticated`, and `connection authorized`.

## Default behavior

By default, Supabase sets `log_connections` to off for new projects and you must enable it first. This behavior matches common managed Postgres defaults and reduces log volume from high-frequency connection events.

Existing projects may retain different settings depending on plan and compliance configuration:

- **Team, Enterprise, and HIPAA organizations** — Connection logging is typically enabled to support audit requirements.
- **HIPAA projects** — Supabase enables connection logging when a project is marked as high compliance. The [Security Advisor](/dashboard/project/_/advisors/security) warns if connection logging is later disabled.

## Compliance considerations

<Admonition type="note">

If you need connection audit evidence for SOC 2 or other compliance programs, you must enable it explicitly.

</Admonition>

Connection logging supports audit and monitoring controls required by some compliance programs:

- **HIPAA** — High-compliance projects should keep connection logging enabled. See the [shared responsibility model for healthcare data](/docs/guides/deployment/shared-responsibility-model#managing-healthcare-data) and [HIPAA compliance guide](/docs/guides/security/hipaa-compliance).
- **SOC 2** — Users who need connection audit evidence should enable logging and retain logs according to their own policies. See the [SOC 2 compliance guide](/docs/guides/security/soc-2-compliance).

Disabling connection logging does not affect other Supabase logging (for example, [Platform Audit Logs](/docs/guides/security/platform-audit-logs), [Auth Audit Logs](/docs/guides/auth/audit-logs), or [pgAudit](/docs/guides/telemetry/logs#configuring-pgauditlog)).

## Manage connection logging via the dashboard

You can configure connection logging from the **Log connections** setting in the [Database Settings](/dashboard/project/_/database/settings) section of the Dashboard.

Ensure that you have [Owner or Admin permissions](/docs/guides/platform/access-control#manage-team-members) for the project.

<Admonition type="note">

Connection events appear in Postgres logs. In the [Logs Explorer](/dashboard/project/_/logs-explorer), connection lifecycle messages may be hidden by default to reduce noise. Use the connection logs filter in the sidebar to show or hide them.

</Admonition>

## Manage connection logging via the Management API

You can also manage connection logging using the [Management API](/docs/reference/api/v1-update-postgres-config):

```bash
# Get your access token from https://supabase.com/dashboard/account/tokens
export SUPABASE_ACCESS_TOKEN="your-access-token"
export PROJECT_REF="your-project-ref"

# Get current Postgres config
curl -X GET "https://api.supabase.com/v1/projects/$PROJECT_REF/config/database/postgres" \
  -H "Authorization: Bearer $SUPABASE_ACCESS_TOKEN"

# Enable connection logging
curl -X PUT "https://api.supabase.com/v1/projects/$PROJECT_REF/config/database/postgres" \
  -H "Authorization: Bearer $SUPABASE_ACCESS_TOKEN" \
  -H "Content-Type: application/json" \
  -d '{
    "log_connections": true
  }'

# Disable connection logging
curl -X PUT "https://api.supabase.com/v1/projects/$PROJECT_REF/config/database/postgres" \
  -H "Authorization: Bearer $SUPABASE_ACCESS_TOKEN" \
  -H "Content-Type: application/json" \
  -d '{
    "log_connections": false
  }'
```

To verify the setting, use the SQL Editor:

```sql
show log_connections;
```
